This is an example of a component _being used in some italic markdown with some <Bolded />, 
and as you can see_ once you close the italics, it will break incorrectly when prettier formats it.

| Column 1 | Column 2 |
| -- | -- |
| **`Row 1 Code`** | Some text. |
| **<code>Row 2 Code</code>** | Some text. |
| **<InlineCode>Row 2 Code</InlineCode>** | Some text. |
